From b2a5be0763ee572bed431335eb4712fac94f5a7b Mon Sep 17 00:00:00 2001
From: Serhiy Storchaka <storchaka@gmail.com>
Date: Wed, 25 Jan 2017 13:23:05 +0200
Subject: Issue #27867: Function PySlice_GetIndicesEx() is replaced with a
 macro if Py_LIMITED_API is not set or set to the value between 0x03050400 and
 0x03060000 (not including) or 0x03060100 or higher.

---
 PC/python3.def | 2 ++
 1 file changed, 2 insertions(+)

(limited to 'PC/python3.def')

diff --git a/PC/python3.def b/PC/python3.def
index d7530494df7..200d6bb7e29 100644
--- a/PC/python3.def
+++ b/PC/python3.def
@@ -527,10 +527,12 @@ EXPORTS
   PySet_Pop=python35.PySet_Pop
   PySet_Size=python35.PySet_Size
   PySet_Type=python35.PySet_Type DATA
+  PySlice_AdjustIndices=python35.PySlice_AdjustIndices
   PySlice_GetIndices=python35.PySlice_GetIndices
   PySlice_GetIndicesEx=python35.PySlice_GetIndicesEx
   PySlice_New=python35.PySlice_New
   PySlice_Type=python35.PySlice_Type DATA
+  PySlice_Unpack=python35.PySlice_Unpack
   PySortWrapper_Type=python35.PySortWrapper_Type DATA
   PyState_AddModule=python35.PyState_AddModule
   PyState_FindModule=python35.PyState_FindModule
-- 
cgit v1.2.3-65-gdbad

